\Header{GeneSOM-internal}{Internal GeneSOM functions}
\alias{ciplot}{GeneSOM-internal}
\alias{inrange}{GeneSOM-internal}
\alias{plotcell}{GeneSOM-internal}
\alias{som.par}{GeneSOM-internal}
\alias{somgrids}{GeneSOM-internal}
\alias{somsum}{GeneSOM-internal}
\keyword{internal}{GeneSOM-internal}
\begin{Description}\relax
Internal GeneSOM functions.\end{Description}
\begin{Usage}
\begin{verbatim}
ciplot(x, y, se, n=1, d, ywindow)
inrange(x, xlim)
plotcell(x, y, dat, code, n, sdbar=1, ylim, yadj)
somgrids(xdim, ydim, color, yadj=0.1, hexa, ntik, ylim)
somsum(obj)
som.par(obj)
\end{verbatim}
\end{Usage}
\begin{Details}\relax
These are not to be called directly by the user.\end{Details}

