\Header{hgByChroms}{A dataset to show the human genome base pair locations per
chromosome.}
\keyword{datasets}{hgByChroms}
\begin{Description}\relax
The data is described above.\end{Description}
\begin{Usage}
\begin{verbatim}data(hgByChroms)\end{verbatim}
\end{Usage}
\begin{Format}\relax
A list, with the names consisting of the names of the chromosomes in
the human genome (thus 24 elements).  Each element consists of a named
vector of +/- values - where each value represents the location of a
base pair (the numeric value is the location, while the +/- denotes
the strand value), with the name providing the name of the base pair.\end{Format}
\begin{Source}\relax
Cheng Li of the Dana-Farber Cancer Institute.\end{Source}
\begin{Examples}
\begin{ExampleCode}
 data(hgByChroms)
\end{ExampleCode}
\end{Examples}

