8 10 12 14 16 -10 -8 -6 -4 -2 0 2

Log_{10}[E (GeV)]

Log10[E2 dN/dE (GeV cm -2 s-1 sr-1)]

SAUND

RICE

FORTE

GLUE

A B

TD

AGN

GZK

Z

WB