Number of Points per Pixel

10^0

10^1

10^2

10^3

10^4

0 5 10 15 20 25 0

5

10

15

20

25

σV (m)

4

3

2

1

0

0 MI: 0

95% 68%

99.9%

epochs: 0 HMI epochs: 0 MI

Alarm Epochs: 0

System Unavailable

Vertical Performance at Stanford University - 0x0421 (261345 seconds)

Error (m)

IPV Operation > 99.999%

epochs: 0 MI

CAT I Oper. > 99.999%

99.9% 95% 68%VPL

WAAS (m)