0 50 100 150 200 250 300 -4 -2 0 2 4

Time (s)

EKG (V) normal.txt

100 105 110 -1 0 1 2

Time (s)

Clean segment

250 255 260 -4 -2 0 2 4

Time (s)

Noisy segment